0 0.2 0.4 0.6 0.8 1 0 1 2 3 4 5 6 7 8 9 10 van der Waals isotermer for R134a

Molart volum (L)

Trykk (MPa)

334 K 334 K (ideell gass) 354 K 374 K (T_c) 394 K 414 K 414 K (ideell gass)